Copyright: Auric Visions Ltd, 2000


History Log Help
The entries in this help file describe the specific History Log file entries


Add Key Log
Add Key Log File Entry


Add Setting Log Entry
Add Setting Log File Entry


Apply Log Entry
Apply Update Log File Entry


Auto Connect Log Entry
Auto Connect Log File Entry


Connected Log Entry
Connected Log File Entry


Connecting Log Entry
Connecting Log File Entry


Disconnected Log Entry
Disconnected Log File Entry


Error Log Entry
Error Log File Entry


Boingo Started Log Entry
Boingo Started Log File Entry


Removed Key Log Entry
Removed Key Log file Entry


Removed Setting Log Entry
Removed Setting Log File Entry


Saved Store Log Entry
Saved Store Log File Entry


Update Available Log Entry